<template>
  <div class="device" ref="device">
    <div class="device-item" v-for="item in deviceList" :key="item">
      <div class="item-header">
        <div style="display: flex; width: 50%">
          <div class="icon-bg">
            <span class="iconfont" :class="getIcongont(item)"></span>
          </div>
          <div class="title">
            <span class="number">{{ item.device_id }}</span>
            <span class="name">{{ item.name }}</span>
            <span class="number type">{{ item.typename }}</span>
          </div>
        </div>

        <div class="status">
          <div class="status-item">
            <span>{{ ['离线', '在线'][item.is_online] }}</span>
            <span class="text">在线状态</span>
          </div>
          <div class="status-item">
            <span>{{ ['正常', '错误'][item.is_error] }}</span>
            <span class="text">故障状态</span>
          </div>
          <div class="status-item">
            <span>{{ ['空闲', '工作'][item.is_running] }}</span>
            <span class="text">工作状态</span>
          </div>
        </div>
      </div>
      <div class="item-content">
        <div v-for="info in item.params" :key="info.k" class="item-info">
          <span class="text">{{ info.k }}：</span>

          <span class="value">{{ info.v }}</span>
        </div>
      </div>
      <div v-if="item.view == 1" class="item-button">
        <span class="text">实时数据：</span>
        <a-button type="primary" size="small" @click="openModal(item)">查看</a-button>
      </div>
    </div>
    <a-modal
      v-model:open="modalOpen"
      @ok="handleOk"
      width="90%"
      class="modal-device"
      :get-container="() => $refs.device"
    >
      <div>
        <div class="title">
          <div>电流电压</div>
          <img src="@/assets/images/titleLine.png" alt="" />
        </div>
        <div class="echarts">
          <predictEcharts
            :chart-options="chartOptions[0]"
            :chart-data="chartData"
            ref="chartRef1"
          />
        </div>
      </div>
      <div>
        <div class="title">
          <div>功率</div>
          <img src="@/assets/images/titleLine.png" alt="" />
        </div>
        <div class="echarts">
          <predictEcharts
            :chart-options="chartOptions[1]"
            :chart-data="chartData"
            ref="chartRef2"
          />
        </div>
      </div>
    </a-modal>
  </div>
</template>

<script>
import predictEcharts from '@/components/predict/predictEcharts.vue'
import { postReq, getReq } from '@/request/api'
import { deviceTypeList } from '@/utils/config'
export default {
  name: '',
  components: { predictEcharts },
  props: {
    stationId: {
      type: String,
      default: ''
    },
    systemType: {
      type: Number,
      default: 1
    }
  },
  data() {
    return {
      modalOpen: false,
      deviceList: [],
      chunengInfo: [
        { label: '运行模式', key: 'operationMode', value: '并网运行' },
        { label: '电池储能容量', key: 'batteryCapacity', value: '100kWh' },
        { label: '实时电压', key: 'voltage', value: '232.5V' },
        { label: '功率因数', key: 'powerFactor', value: '0.95' },
        { label: '实时电流', key: 'current', value: '0.01A' },
        { label: '额定电压', key: 'ratedVoltage', value: '232.5V' },
        { label: '实时功率', key: 'power', value: '0.01kW' },
        { label: '额定电流', key: 'ratedCurrent', value: '0.01A' },
        { label: '实时数据', key: 'realTimeData', value: '0.01kWh' },
        { label: '额定功率', key: 'ratedPower', value: '0.01kW' },
        { label: '冷却方式', key: 'coolingMethod', value: '风冷' }
      ],
      chartOptions: [
        {
          type: 'line',
          smooth: true,
          dataKey: 'chargeDischarge',
          infoKeys: [
            {
              key: 'V',
              label: '电压',
              seriesOptions: {
                symbol: 'circle',
                symbolSize: 8,
                itemStyle: {
                  color: '#00FDF9' // 充电电量线条颜色
                },
                lineStyle: {
                  color: '#00FDF9' // 充电电量线条颜色
                }
              }
            },
            {
              key: 'I',
              label: '电流',
              seriesOptions: {
                symbol: 'circle',
                symbolSize: 8,
                itemStyle: {
                  color: '#3E7EEF' // 充电电量线条颜色
                },
                lineStyle: {
                  color: '#3E7EEF' // 充电电量线条颜色
                }
              }
            }
          ]
        },
        {
          type: 'line',
          smooth: true,
          dataKey: 'chargeDischarge',
          infoKeys: [
            {
              key: 'P',
              label: '功率',
              seriesOptions: {
                symbol: 'circle',
                symbolSize: 8,
                itemStyle: {
                  color: '#00FDF9' // 充电电量线条颜色
                },
                lineStyle: {
                  color: '#00FDF9' // 充电电量线条颜色
                }
              }
            }
          ]
        }
      ],

      chartData: {
        xdata: [],
        ydata: {}
      }
    }
  },
  watch: {
    // 监听父组件数据变化
    stationId(newVal) {
      if (newVal) {
        this.getDeviceList()
      }
    },
    systemType(newVal, oldVal) {
      if (newVal !== oldVal) {
        this.getDeviceList()
      }
    }
  },
  mounted() {
    this.getDeviceList()
  },
  methods: {
    getIcongont(ele) {
      return deviceTypeList.find((item) => item.value == ele.type).iconfont || ''
    },
    generateTimePoints() {
      const timePoints = []

      for (let hour = 0; hour <= 24; hour++) {
        for (let minute = 0; minute < 60; minute += 10) {
          // 处理24:00的特殊情况
          if (hour === 24 && minute === 0) {
            timePoints.push('24:00')
            break
          }

          // 格式化小时和分钟，确保两位数
          const formattedHour = hour.toString().padStart(2, '0')
          const formattedMinute = minute.toString().padStart(2, '0')

          timePoints.push(`${formattedHour}:${formattedMinute}`)
        }
      }

      return timePoints
    },
    //查看实时数据
    async getDevicCharts(item) {
      try {
        const res = await getReq('/queryDevicCharts', {
          station_id: this.stationId,
          device_id: item.device_id
        })
        this.chartData.ydata = res.data
        this.chartData.xdata = this.generateTimePoints()
        this.$refs.chartRef1.initCharts()
        this.$refs.chartRef2.initCharts()

      } catch (error) {
        console.log(error)
      }
    },

    //请求运行监控系统设备信息
    async getDeviceList() {
      try {
        const res = await getReq('/queryDevicByCategory', {
          station_id: this.stationId,
          category: this.systemType
        })

        this.deviceList = res.data
      } catch (error) {
        this.deviceList = []

        console.log(error)
      }
    },
    async openModal(item) {
      await this.getDevicCharts(item)

      this.modalOpen = true
    },
    handleOk() {
      this.modalOpen = false
    }
  }
}
</script>

<style lang="scss" scoped>
.device {
  width: 100%;
  height: 100%;
  margin-left: 20px;
  display: grid;
  grid-gap: 20px;
  grid-template-columns: 1fr 1fr 1fr;
  overflow-y: auto;
  .device-item {
    border-radius: 15px;

    background: $bg2-color;
    padding: 15px;
    .item-header {
      display: flex;
      align-items: center;
      height: 70px;
      color: #fff;
      justify-content: space-between;
      .icon-bg {
        width: 66px;
        height: 66px;
        text-align: center;
        line-height: 66px;
        border-radius: 6px;
        background: linear-gradient(90deg, #3dfefa 0%, #2a82e4 2.96%, #27a188 100%),
          linear-gradient(90deg, #3dfefa 0%, #01dfef 2.96%, #08a5ff 100%);
        .iconfont {
          font-size: 50px;
        }
      }
      .title {
        display: flex;
        flex-direction: column;
        justify-content: space-around;
        margin-left: 15px;
      }
      .number {
        font-size: 12px;
      }
      .name {
        font-size: 14px;
      }
      .type {
        color: #08a5ff;
      }
      .status {
        display: flex;
        font-size: 14px;
        height: 100%;
        width: 50%;
        justify-content: space-between;
        &-item {
          display: flex;
          flex-direction: column;
          text-align: center;
          justify-content: space-evenly;
          span:first-child {
            font-weight: 700;
          }
          .text {
            color: $text-color;
          }
        }
      }
    }
    .item-content {
      grid-template-columns: 1fr 1fr;
      color: #fff;
      display: grid;
      // line-height: 45px;
      margin-top: 15px;
      padding: 0 10px;
      height: 120px;
      overflow-y: auto;
      .value {
        font-weight: 700;
      }
      .item-info {
        height: 30px;
      }
    }
    .item-button {
      padding-left: 10px;
    }
    .text {
      color: $text-color;
    }
    .video {
      margin-top: 10px;
    }
  }
}
.environment {
  width: 200px;
}
:deep(.modal-device) {
  color: #fff;
  .title {
    display: flex;
    font-weight: 700;
    flex-direction: column;

    img {
      width: 232px;
      height: 6px;
      margin-top: 10px;
    }
  }
  .echarts {
    width: 100%;
    height: 280px;
  }
}
</style>
